%%
%% This is file `sfonts.def',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% slifonts.fdd  (with options: `main')
%% 
%% This is a generated file.
%% 
%% Copyright 1993 1994 1995 1996 1997 1998 1999
%% The LaTeX3 Project and any individual authors listed elsewhere
%% in this file.
%% 
%% This file is part of the LaTeX2e system.
%% ----------------------------------------
%% 
%% It may be distributed under the terms of the LaTeX Project Public
%% License, as described in lppl.txt in the base LaTeX distribution.
%% Either version 1.0 or, at your option, any later version.
%% 
%% Details of how to use a configuration file to modify this part of
%% the system are in the document cfgguide.tex.
%% 
%% 
\ProvidesFile{sfonts.def}
        [1998/06/12 v2.2e Standard LaTeX slide font definitions]
\DeclareErrorFont{OT1}{lcmss}{m}{n}{19.907}
\DeclareFontSubstitution{OT1}{lcmss}{m}{n}
\input ot1lcmss.fd
\endinput
%%
%% End of file `sfonts.def'.
